^rStd. Format ZVEI^r

Enabling  this  option  will  set all  Select  5  decoder  and encoder
frequencies to the ZVEI tone set. 


By changing the signalling format the following options are deleted:

         - H746 Extended 1st Tone ENC/DEC  
         - H687 Extended 1st Tone on RAT






The Std. ZVEI Tone set will be:

     Tone    Frequency  | Tone   Frequency  | Tone   Frequency
     Number    (Hz)     | Number   (Hz)     | Number   (Hz)
     -------------------+-------------------+------------------
       1       1060     |   5      1530     |   9      2200
       2       1160     |   6      1670     |   0      2400
       3       1270     |   7      1830     |   G      2800
       4       1400     |   8      2000     |   R      2600

     The tone duration will be 70 ms.

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
