^rEncode Pretime^r

This option cannot  be enabled  or disabled.  Only the Encoder Pretime
Duration can be  modified  from  0 to 1135 ms  in  4.45  ms steps. The
software automatically rounds the entered value to the next valid one.
Entering "0" in the data field will disable the pretime.

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
