^rTime Out Timer / Rekey Delay^r

This option allows definition of a Transmit Time Out Time and  a Rekey
Delay up to 288 sec.  If no Transmit Time  Out Timer is  required then
the value "0" must be entered in the TIMEOUT data field or the "Select
Key"  [F2] should be used.  To omit the Rekey Delay the value "0" must
be entered in the REKEY data field.  Enabling the Time  Out Timer sets
TIMEOUT to 60 sec and REKEY to 0 sec.

Allowed data ranges:

     Keyword    Field Programmer   Stic form

     TIMEOUT    0-288 sec          0-255 sec
     REKEY      0-288 sec          0- 30 sec

The field programmer  automatically rounds  up  the data  entry to the
next valid duration the radio will handle.

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
