^rStd. Auto Reset Carrier Override^r

This option allows definition of an Auto Reset Timer up to 288 sec. To
disable  the auto  reset timer the value "0"  must be  entered  in the
TIMEOUT data field or the "Select Key"  [F2] should be  used. Enabling
the Auto Reset Timer sets the duration on default to 7 sec.

Allowed data ranges:

     Keyword   Field Programmer   Stic Form

     AUTOREST  0-288 sec          0-60 sec

The field programmer  automatically rounds  up  the data  entry to the
next valid duration the radio will handle.

If H365  TX  Inhibit on  Busy Channel  is ordered then the  Auto Reset
Timer cannot  be  disabled.  It can be  changed  only  from  a carrier
override to a carrier independent type.

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
