^rStd. Quiet Monitor^r

This option can be enabled on all channels that will have a PL Decoder
and/or a Select 5 decoder enabled. It will be disabled when PL Decoder
and Select 5 Decoder are deleted.

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
