^rSingle Tone All Call^r
Allowed data ranges:

                    FREQUENCY 300 - 3000 Hz
                    DURATION   98 - 1100 ms

The field programmer  automatically rounds  up  the data  entry to the
next valid duration the radio will handle.

The duration will override the RESETDUR  of  option H632 Authorisation
with Single Tone Reset, if enabled.

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
