^rSTD. Call Code^r

Following digits are allowed  to be entered:  "0-9,G,R,J,K,L,M". It is
not required to define the "R"  tone when equal numbers are following.
The software accepts sequences like "11122".
For MX2000 and 3000 radios variable positions can be also defined.
The variable positions have to be defined below the required  tone code
positions.  Tone code positions that  have to be  fixed can be  entered
with the space key or the "_" key.

When  no  variable position is  defined (MULTVAR data field  shows "_"
characters in the lenght of the BASECODE filed) then a fixed Call Code
is  defined only.  For  MX2000  radios two variable positions  and for
MX3000 radios five variable positions can be defined.
       

To select the MULTVAR data field the [TAB] key has to be used.

Applicable Models: MX1000,         for Fixed Call code
                   MX2000, MX3000  for Multicall code

                 * * *  END  OF  HELP  TEXT  * * *
