^rH633 Trakmode- TOT Disable^r
This  feature disables  the Standard  Transmit Time  Out Time that is
defined  per radio (Standard  Time out Timer on the option screen) on
the selected Trakmode.
If  the Standard  Time out  Timer is  disabled per  radio  then  this
feature will not appear in the Trakmode table.

This option requires one of the following options:

         STD. Time Out Timer


Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
