^rH633 Trakmode- Manual & Automatic RAT Disable^r

This feature disables H685 Manual  and Automatic  RAT on the selected
Trakmode.
If  H685 Manual  and Automatic  RAT is disabled  per radio  then this
feature will not appear in the Trakmode table.

This option requires one of the following options:

         H685 Manual & Automatic RAT






Incompatible options:

         H642 Decode only
         H809 Omit 5 Tone Enc./Dec.
         H633 Trakmode- Omit 5 Tone Enc./Dec.
         H633 Trakmode- Decode only


Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
