^rH633 Trakmode- Flat Audio Response Disable^r
This  feature  disables H688  Flat Audio  Response on  the  selected
Trakmode.
If H688  Flat Audio Response is disabled per radio then this feature
will not appear in the Trakmode table.
                 

This option requires one of the following options:

         H688 Flat Audio Response


Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
