^rH633 Trakmode- Encode Pretime^r

Up to  two different  encoder  pretimes in  addition  to the  pretime
selected  on the  option screen  may be independently  programmed per
Trakmode. The  Encoder Pretime  duration can  be modified  from  0 to
1135 ms in  4.45 ms  steps. The  software  automatically  rounds  the
entered  value to  the next valid one. Entering "0" in the data field 
disables the pretime.
                 
This option requires one of the following options:

         STD 140ms Encoder Pretime




Incompatible options:
         
         H642 Decode only
         H809 Omit 5 Tone Enc./Dec.
         H633 Trakmode- Decode only
         H633 Trakmode- Omit 5 Tone Enc./Dec.

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
