^rH633 Trakmode- RAT X Tone Sequential^r

The data field on the Trakmode screen shows the code sequence that is
defined for the selected Trakmode. A blank data field on the Trakmode
screen  means that  no RAT code  is enabled, while a blank entry on a
STIC form means that the per radio data (if any) is used.
 
The following digits are allowed to be entered: "0-9,G,R,J,K,L,M".
It  is not  required to  define  the "R" tone  when equal numbers are
following. The software accepts also sequences like "11122".

Deleting this option will reset H975 Unit ID after RAT if it was
enabled.
                 


Incompatible options:

         H642 Decode only
         H809 Omit 5 Tone Enc./Dec.
         H633 Trakmode- Omit 5 Tone Enc./Dec.
         H633 Trakmode- Decode only


Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
