^rH633 Trakmode- RAT X Tone Selectable^r
The variable positions have to be defined below the required tone code
positions. Tone  codes that  have to be fixed can be entered with the
space key " " or the "_" key.

Incompatible options to this option:

         H642 Decode only
         H809 Omit 5 Tone Enc./Dec.
         H633 Trakmode- Decode only
         H633 Trakmode- Omit 5 Tone Enc./Dec.

Applicable Model: MX3000

                 * * *  END  OF  HELP  TEXT  * * *
