^rH633 Trakmode- Call Code^r

The data field on the Trakmode screen shows the code sequence that is
defined for the selected Trakmode. A blank data field on the Trakmode
screen  means that  no Call code is enabled, while a blank entry on a
STIC form means that the per radio data (if any) is used.
 
The following digits are allowed to be entered: "0-9,G,R,J,K,L,M".
It is  not required  to define  the "R" tone  when equal  numbers are 
following. The software accepts also sequences like "11122".





                 
Incompatible options:

         H642 Decode only
         H809 Omit 5 Tone Enc./Dec.
         H633 Trakmode- Omit 5 Tone Enc./Dec.
         H633 Trakmode- Decode only


Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
