^rH633 Trakmode- Multicall Level^r

The variable positions have to be defined below the required tone code
positions. Tone code position that  have to be fixed can be entered  
with the space key " " or the "_" key.
                                                            
This option requires one of the following options:

         STD. Call Code
         H633 Trakmode Call Code per Mode






Incompatible options:

         H642 Decode only
         H809 Omit 5 Tone Enc./Dec.
         H633 Trakmode- Decode only
         H633 Trakmode- Omit 5 Tone Enc./Dec.


Applicable Model: MX3000

                 * * *  END  OF  HELP  TEXT  * * *
