^rH633 Trakmode- Multicall Disable (100)^r

This feature allows the Multicall 100 level menu to be selectively
disabled per Trakmode.
                                        
This option requires one of the following options:

         STD. Multicall


Incompatible options to this option:

         H642 Decode only
         H809 Omit 5 Tone Enc./Dec.
         H633 Trakmode- Decode only
         H633 Trakmode- Omit 5 Tone Enc./Dec.
Applicable Model: MX2000

                 * * *  END  OF  HELP  TEXT  * * *
