^rH633 Trakmode- Unit Id Code^r

The data field on the Trakmode screen shows the code sequence that is
defined for the selected Trakmode. A blank data field on the Trakmode
screen means that no Unit ID code is  enabled, while a blank entry on 
a STIC form means that the per radio data (if any) is used.
   
The  following digits  are allowed  to be entered: "0-9,G,R,J,K,L,M".
It is  not required  to define  the "R"  tone when  equal numbers are
following. The software accepts also sequences like "11122".






This option requires one of the following options:

         H958 Unit ID on PTT
         H960 Unit ID once on PTT
         H976 Unit ID upon dekey of PTT
         H663 Unit ID on PTT & after PTT
         H959 Unit ID before Call
         H977 Unit ID after Call
         H966 Unit ID before & after Call
         H975 Unit ID after RAT
         H682 Unit ID repeat on PTT





Incompatible options:

         H924 Encode only
         H809 Omit 5 Tone Enc./Dec.
         H633 Trakmode- Omit 5 Tone Enc./Dec.
         H633 Trakmode- Decode only

   
Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
