^rH633 Trakmode- Decode Code^r



The data field on the Trakmode screen shows the code sequence that is
defined for the selected Trakmode. A blank data field on the Trakmode
screen means that no Decoder code is enabled, while a blank  entry on 
a STIC form means that the per radio data (if any) is used.
 
The following digits are allowed to be entered: "0-9,G,R,J,K,L,M".
It  is not  required  to define  the "R" tone  when equal numbers are
following. The software accepts also sequences like "11122".




^rEncode only, Omit Encode/Decode:^r
This  STIC feature  can be  generated  from  the  field programmer by
deleting  the data  entries of  the decoder  code (Overwrite existing 
data with blanks or use [F4] to clear data field):

  - Decode Code            TMDECODE : "       "
                 
Incompatible options:

         H924 Encode only
         H809 Omit 5 Tone Enc./Dec.
 
Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
