^rH633 Trakmode- Group Call Level^r

This data field requires a Decoder code. For STIC form  compatibility
maximum 5 group call positions can be defined. 

Group Call disable:
-------------------
This  STIC feature  can be  generated  from the  field  programmer by
deleting the data entries of the group call level (Overwrite existing
data with blanks or use [F4] to clear data field):

  - Group Call Level        TMGPCODE : "       "



                 
This option requires one of the following options:

         H741 STD Group Call
         H624 Expanded Group Call
         STD. Decode Code
         H633 Trakmode- Decode Code per Mode


Incompatible options:

         H924 Encode only
         H809 Omit 5 Tone Enc./Dec.
         H633 Trakmode- Encode only
         H633 Trakmode- Omit 5 Tone Enc./Dec.


Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *


