^rH633 Trakmode- Auto Acknowledge Code^r
The data field on the Trakmode screen shows the code sequence that is
defined for the selected Trakmode. A blank data field on the Trakmode
screen means that no Auto Acknowledge code is enabled, while a  blank
entry on  a STIC form means that the per radio data (if any) is used.
 
The the following digits are allowed to be entered: "0-9,G,R,J,K,L,M".
It is not required to define the "R" tone when equal numbers  are the
following. The software accepts also sequences like "11122".

^rAuto Ack disable:^r
This  STIC feature  can be  generated from  the field  programmer  by
deleting  the data  entries  of the  auto acknowledge code (Overwrite
existing data with blanks or use [F4] to clear data field):

  - Auto Acknowledge Code   STAUTOAK : "       "
This option requires one of the following options:

         STD. Decode Code
         H633 Trakmode- Decode Code per Mode

Incompatible options:

         H924 Encode only
         H809 Omit 5 Tone Enc./Dec.
         H633 Trakmode- 5 Tone Encode only
         H633 Trakmode- Omit 5 Tone Enc./Dec.

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
