^rHelp for Channel Assignment Table^r

RF Power level:
---------------
Individual power levels  per channel can be  defined  in  this column.
The following numbers must be used for the different power levels:

low power = 0, medium power = 1, high power = 2, special power = 3.

The power level 3  can be set from  a field programmer  only. Refer to
options RF Power for more information.     





PTT Monitor:
------------
The PTT Monitor option can be defined per channel only  from the field
programmer and this feature allows selective disabling or  enabling of
H930 PTT Monitor per channel.

Due to the complex interaction of options the recommended procedure to
edit this function is:

1. Set all standard options and features on the option screen as required.
2. Edit the Trakmode screen if required.
3. Edit the channel assignment table as required.




Trakmode number:
----------------
This column is for reference only.  It shows the Trakmode numbers that
have  been  assigned to the different channels  by  using the Trakmode
screen.

Scan List:
---------
This column is for reference only.  It contains the assigned scan list
number.

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
