^rHelp for Channel Frequency Table^r

Depending on the radio configuration or option  settings the following
columns can appear in the channel frequency table:

^rZone #, Ch. #:^r
These columns are for reference only and cannot be edited. To insert or
delete zones [shift]+[F7] or [shift]+[F8] must  be used,  to insert or
delete channels [F7] or [F8] must be used.


^rSide effects of insert/delete of a channel or zone:^r
Delete or insert of channels or zones may have effects on other options
which use absolute channel references, because the referenced channels
will not longer exist or will be changed their channel or zone number.

To prevent malfunction of the radio please check the following options
for valid channel references after insert or delete was used:

 Auto Acknowledge Revert Channel
 H923 Emergency on progr. channel
 H368 Short Call Alphanumeric
 H633 Standard Trakmode
 H344 Channel Slaved Scan List








^rPL Encode, PL Decode:^r
These columns always appears.  PL frequencies can be  entered from 50.0
to 300.0  Hz.  The following list of commonly  used frequencies  may be
entered on the stic form using the codes shown.

XZ = 67.0   WZ = 69.3   XA = 71.9   WA = 74.4   XB = 77.0   WB = 79.7
YZ = 82.5   YA = 85.4   YB = 88.5   ZZ = 91.5   ZA = 94.8   ZB = 97.4
1Z =100.0   1A =103.5   1B =107.2   2Z =110.9   2A =114.8   2B =118.8
3Z =123.0   3A =127.3   3B =131.8   4Z =136.5   4A =141.3   4B =146.2
5Z =151.4   5A =156.7   5B =162.2   6Z =167.9   6A =173.8   6B =179.9
7Z =186.2   7A =192.8   M1 =203.5   8Z =106.5   M2 =210.7   M3 =218.1
M4 =225.7   M5 =233.6   M6 =241.8   M7 =250.3

The PL codes are not accepted from the field programmer  but are valid
for a STIC Form entry.

^rTransmit Frequency and Receive Frequency:^r
These columns always  appear in this  table.  To define a receive only
channel  the Transmit  Frequency field must  be  cleared with  [F4] or
filled with space characters.  Only frequencies that  can be generated
from the radio are accepted.


^rH346 Zone Dsp.:^r
When "H346  Zone Display"  is disabled on the option  screen then this
column contains  the default names for  the  different  zones. Default
names are "Z1"  ...  "Zn" where "n" is the number of the last zone. By
changing a minimum of one zone  name  in this column  the option "H346
Zone Display" becomes enabled.



^rH380 Channel Display:^r
In a zone radio  5 alphanumeric digits and in a channel radio  up to 8
alphanumeric digits  can be  defined for the channel  display  in this
column.

                 * * *  END  OF  HELP  TEXT  * * *
