^rHelp for Scan List Assignment Table^r

Every data field can be selected with [TAB], [Shift_TAB],
[Cur_up] and [Cur_dn].

A blank data field on the screen has the following meaning:
The channel  exists and  is not assigned  to a  scan  list.

A data field showing "**" means:
The channel does not exist.

                 * * *  END  OF  HELP  TEXT  * * *

