^rHelp for Scan List Data Table^r

[Page_up] and [Page_dn] selects the next assigned scan list.

Only  those  data  fields  that  match  with  the  radio  software
configuration  (Channel  /  Zone  radio)  are  shown.

Defining a Designated TX channel enables option 

         H382 Designated Transmit Channel

as  a  reference  on  the  option  screen.

[F7] "Insert Entry" and  [F8] "Delete Entry" can  be used to insert a
new  entry below  the selected  data field  or to delete the selected 
entry.

                 * * *  END  OF  HELP  TEXT  * * *

