^rHelp for STD. Preassigned TX Channel^r

If  this option is  enabled on the  option screen, then all scan lists
will use the preassigned transmit  channel  (The  last  active channel
before entering the scan mode).

Applicable Models: MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
