^rHelp for Power up Alert^r

This  feature is  programmable  from  a  field  programmer  only. This
option determines if an alert will be given after power up or not. 

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
