^rHelp for Side Tone Volume^r

This feature is programmable from a field programmer only. The side
tone volume can be set to  any value between 0 and 255. The default
value for a 20/25 kHz radio is 127 and for a 12.5 kHz radio 151. 

Applicable Models: MX1000, MX2000, MX3000


                 * * *  END  OF  HELP  TEXT  * * *
