^rHelp for Minimum Audio Volume Setting^r

This feature is programmable from a field programmer only.The minimum
volume  level can  be set to any value between 0 and 255. The default
value is 96.

For  changing  the  Audio  Volume  Setting  in  the  radio, overwrite
existing value and then use

   [F10] Exit Option Screen
   [F3]  Read (Write) Codeplug Data from (to) Radio or Diskette and
   [F4]  Program Radio with Codeplug Data

to write new data to the radio.    


Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
