^rHelp for Auto Acknowledge Delay^r

This  feature  is  programmable  from  a field  programmer  only.  The 
acknowledge delay time  determines  the amount of time the radio waits 
in receive  mode before starting its auto acknowledge sequence. It can
be programmed in steps of 4.45 ms. The default value is 196 ms. 

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *

