^rH273 Operator selectable Scan^r

This option  allows the operator  to programme a scan  sequence (up to
10 channels) via the keypad.


This option requires one of the following options:

       * H923 Emergency on programmed Channel

       * If Emergency options
                     H961 Emergency Scheme A or
                     H962 Emergency Scheme B or
                     H963 Emergency Scheme C
         have  been  ordered.    

Incompatible options to this option:

         H365 Transmit inhibit on busy Channel
         H930 PTT Monitor
         H620 Auto Acknowlegde
         H646 Auto Acknowledge with Status


Applicable Model: MX3000

                 * * *  END  OF  HELP  TEXT  * * *
