^rH276 Open Squelch Monitor^r

This option will be enabled automatically when no PL Decoder or Select
5 Decoder is enabled in the radio.
                                    

Incompatible options to this option:

         H365 TX Inhibit on Busy Channel

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
