^rH297 DTMF Interconnect^r

The following digits are allowed to be entered: "0-9","#","*" and "P"
which stands for "pause". 

For STIC Form compatibility only 8 digits are allowed. 

Applicable Model: MX3000

                 * * *  END  OF  HELP  TEXT  * * *
