^rH344 Channel slaved Scan^r

With this option, each channel in the radio can have a scan list tied
to it.  Each  scan list can be  comprised of up to 10 channels. There
will be a maximum of 10 scan lists per radio.


This option requires one of the following options:

       * H923 Emergency on programmed Channel

       * If Emergency options
                     H961 Emergency Scheme A or
                     H962 Emergency Scheme B or
                     H963 Emergency Scheme C
         have  been  ordered.    
Incompatible options:

         H365 Transmit inhibit on busy Channel
         H930 PTT Monitor
         H620 Auto Acknowledge
         H646 Auto Acknowledge with Status

         
Applicable Models: MX2000, MX3000        

                 * * *  END  OF  HELP  TEXT  * * *
