^rH345 Radio Lock^r

Enabling  this  option  will  set the default  password  which  is all
blanks.  The  password  itself may be programmed via the radio keypad.
If the option was  enabled in the  radio the PASSWORD  data field will
show  the actual  password  that  is  valid for  the  radio. Following
characters can appear: 0-9,# and *.

Applicable Model: MX3000

                 * * *  END  OF  HELP  TEXT  * * *
