^rH346 Zone Display^r

This  option can be edited  in "Channel Information  Frequency Table".
When the option  is  disabled,  the  "H346  Zone Dsp."  column  in the
Channel Frequency Table contains  the default names for  the different
zones.  Default names are "Z1" ... "Zn" where "n" is the number of the
last  zone.  By  changing  a minimum  of one zone name in the "Channel
Information Frequency Table" this option automatically becomes enabled.

To  reset all zone  names to  the  default  names  [F2]-SELECT  can be
pressed on the option screen.


This option requires one of the following options:

         H372 Zones
Incompatible options:

         H396 Channel entry via Keypad


Applicable Models: MX2000, MX3000.

                 * * *  END  OF  HELP  TEXT  * * *
