^rH365 TX Inhibit on Busy Channel^r

This option can be enabled on all channels that will have a PL Decoder
and/or a Select 5 decoder enabled. When H365 becomes enabled following
options are automatically set to the required status:


         H359 Channel Busy LED becomes enabled,
         H906 Low Battery LED becomes disabled,


If no Auto Reset Timer is enabled then the Std.  Auto Reset Timer will
be enabled with 7 sec. 
This option will be disabled when PL Decoder and Select  5 Decoder are
deleted.

This option requires one of the following options:

         STD. Decode Code 
         STD. PL Decode Code
         STD. Auto Reset Carrier Override
         H733 Auto Reset Carrier Independent 
         STD. Quiet Monitor

Incompatible options to this option:

         H924 Encode only
         H809 Omit 5 Tone Enc./Dec.
         H276 Open Squelch Monitor
         H273 Operator selectable Scan List
         H344 Channel Slaved Scan List
         H632 Authorisation with Single Tone Reset
Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
