^rH368 Short Call Alphanumeric^r

This option can be enabled only when  one of the  following options is
set: H958, H663, H682, H960. In addition a UNIT ID CODE for one of these
options is required per radio. This means there cannot be a trakmode 
without a UNIT ID CODE assigned.

Dependent on the radio configuration the following columns can appear in
the Short Call Alphanumeric table:

^rCall  #^r:  This column is for reference  only and cannot be  edited. To
insert or delete alphanumeric shortcalls [F7] or [F8] must be used.

^rZone #,  SHOZONE^r:  This column is used to define a valid  zone for the
selected shortcall number. It will appear only in a zone radio.

^rChannel #,  SHOCACH^r: This column is used to define a valid channel for
the selected shortcall number.
^rCall Code,  SHOCACD^r:  The following  digits are allowed to be entered:
"0-9,G,R,J,K,L,M".  It  is  not required  to define the "R"  tone when
equal numbers are following. The software accepts sequences like "11122".

^rDisplay,  SHOCALN^r:  8  alphanumeric characters can be defined  for the
shortcall display.
            
This option requires one of the following options:

         H958 Unit ID on PTT
         H663 Unit ID on PTT and after PTT
         H960 Unit ID once on PTT
         H682 Unit ID repeat on PTT

Incompatible options:

         H642 Decode only
         H809 Omit 5 Tone Enc./Dec.
         H976 Unit ID upon dekey of PTT
              

Applicable Models: MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
