^rH375 Selectable PL Encode^r

Any frequency between 50.0 and 300.0 Hz can be entered in 0.1 Hz steps. 
The following list of commonly  used  frequencies may be entered on the
STIC form using the codes shown.

XZ = 67.0   WZ = 69.3   XA = 71.9   WA = 74.4   XB = 77.0   WB = 79.7
YZ = 82.5   YA = 85.4   YB = 88.5   ZZ = 91.5   ZA = 94.8   ZB = 97.4
1Z =100.0   1A =103.5   1B =107.2   2Z =110.9   2A =114.8   2B =118.8
3Z =123.0   3A =127.3   3B =131.8   4Z =136.5   4A =141.3   4B =146.2
5Z =151.4   5A =156.7   5B =162.2   6Z =167.9   6A =173.8   6B =179.9
7Z =186.2   7A =192.8   M1 =203.5   8Z =106.5   M2 =210.7   M3 =218.1
M4 =225.7   M5 =233.6   M6 =241.8   M7 =250.3

The PL codes are not accepted from the field programmer but are valid
for a STIC form entry.

Max. 32 different PL frequencies can be defined. 
Unique selectable PL-frequencies count as 2 different frequencies.
Any  selectable PL-frequency  which matches  to a channel defined,
counts as 1.

Applicable Models: MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
