^rH376 Non STD. Transmit Response Time^r
             
This option requires a scan function in the radio.  When enabling H273
and/or H344  in the radio then  "H376  Transmit Response Time" becomes
enabled with 3 sec. default.


This option requires one of the following options:

         H273 Operator selectable Scan
         H344 Channel slaved Scan

               



Incompatible options:

         H365 Transmit Inhibit on busy Channel
         H930 PTT Monitor


Applicable Models: MX2000, MX3000                


                 * * *  END  OF  HELP  TEXT  * * *
