^rH382 Designated TX Channel^r

If this option is enabled on the option screen  then a  minimum of one
scan  list is assigned to a designated transmit channel.


This option requires one of the following:

         H344 Channel slaved Scan


Applicable Models: MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
