^rH396 Channel Entry via Keypad^r

When  this  option  is enabled, the channel  selection  must  be  made
directly through the keypad  of the radio.  Up to 100  channels may be
defined in the "Channel Information Frequency Table".
                               
Incompatible options to this option:

         H346 Zone Display
         H380 Channel Display (Zone Radios)


Applicable Models: MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
