^rH397 Menu Security Lock^r
Enabling this option will set the default menu  security lock password
which is all blanks.  The password  itself  may be programmed  via the
radio keypad.
If the option  was enabled in  the radio the KEYLOCK  data  field will
show  the actual  password  that  is  valid for  the  radio. Following
characters can appear: 0-9,# and *.
 
Incompatible options:
 
         H153 Omit Alert Tones

Applicable Model: MX3000

                 * * *  END  OF  HELP  TEXT  * * *
