^rH620 Auto Acknowledge^r

The following digits are allowed  to be entered:  "0-9,G,R,J,K,L,M". It is
not required to define the "R"  tone when equal numbers are following.
The software accepts sequences like "11122".


This option requires one of the following options:

         STD. Decode Code
         H633 Trakmode- Decode Code per Mode




    
Incompatible options:
                     
         H924 Encode only
         H809 Omit 5 Tone Enc./Dec.
         H273 Operater selectable Scan
         H344 Channel slaved Scan 
                                 

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
