^rH624 Expanded Group Call^r

This  option  requires  a Decoder Code.   For STIC  form compatibility
a maximum of 5 groupcall positions can be defined.   

^rNote:^r The group call digit defined must not be used as part of the
      decode code.     

This option requires one of the following options:

         Decode Code (STD.)
         H633 Trakmode- Decode Code per Mode

                  


Incompatible options to this option:

         H924 Encode Only
         H809 Omit 5 Tone Enc./Dec.


Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
