^rH626 Fixed Alphanumeric Multicall^r

The following columns appear in the Fixed Alphanumeric Multicall table:

^rCall #^r:  This column is  for reference only  and cannot  be edited. To
insert or delete alphanumeric shortcalls [F7] or [F8] must be used.

^rCall Code PROGCL^r: This column is used to define the call code sequence
for the selected Multicall  sequence.  The following digits are allowed to
be entered:  "0-9,G,R,J,K,L,M".  It is not required to define  the "R"
tone when equal numbers are following.  The software accepts sequences
like "11122".

^rDisplay PROGDS^r:  8  alphanumeric  characters  can be  defined  for the
Alphanumeric Multicall display.

Incompatible options:

         H642 Decode Only
         H809 Omit 5 Tone Enc./Dec.
         H683 Autocall repeat (2X)


Applicable Model: MX2000

                 * * *  END  OF  HELP  TEXT  * * *
