^rH632 Authoris. w/ Single Tone Reset^r
Allowed data ranges:

     Keyword    Field Programmer    Stic Form

     RESETST    300 - 3000 Hz       800 - 3000 Hz
     RESETDUR    98 - 1100 ms       100 - 1000 ms

The  field programmer  automatically rounds  up the data entry  to the
next valid duration the radio will handle.  The duration will override
the DURATION of option Single Tone All Call if enabled.
                  
This option requires one of the following options:

         STD  Decode Code
         H633 Trakmode- Decode Code per Mode
Incompatible options:

         H960 Unit ID once on PTT
         H365 Transmit Inhibit on busy Channel
       * H368 Shortcall Alphanumeric
         H924 Encode only
         H642 Decode only
         H809 Omit 5 Tone Enc/Dec
         H930 PTT Monitor
                  
       * On a per channel  basis, shortcall  would be  compatible but 
         only on  those  shortcall  revert  channels  that have  been 
         defined  per  trakmode as  authorization  disable  channels.




Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
