^rH641 Multicall Range^r

This  option  requires  variable positions in  the MULTVAR data  field of
the Call Code.
The user has to ensure  that the least significant digits of the variable
positions  correspond with  the least significant digits of the Multicall
range.  The field programmer cannot check this because it  is  allowed to
define different  Multicalls per Trakmode. Digits that do not match won't
affect the radio.
         

This option requires one of the following:

         STD. Multicall
         H633 Trakmode- Multicall Level

Incompatible options:

         H642 Decode only
         H809 Omit 5 Tone Enc./Dec.


Applicable Model: MX3000

                 * * *  END  OF  HELP  TEXT  * * *
