^rH642 Decode only^r

This  option  can be  enabled only  in  the Main  Menu,  [F7]  - Radio
Configuration, [F3] - Radio Software Configuration.

Incompatible options to this option:

       * Side Tones enabled
         140 ms Encoder Pretime
         Call Code
         Multicall
         H687 Extended first Tone on Rat
         H958 Unit ID on PTT
         H960 Unit ID once on PTT
         H976 Unit ID upon Dekey of PTT
         H663 Unit ID on PTT and after PTT
Incompatible options (cont'd):

         H959 Unid ID before Call
         H977 Unit ID after Call
         H966 Unit ID before & after Call
         H975 Unit ID after RAT
         H682 Unit ID repeat on PTT
         H684 End of Message Tone
         H623 Emergency Encode Lockout
         H692 RAT X Tone sequential
         H693 RAT X Tone selectable
         H685 Manual & Automatic Repeater
         H626 Fixed Alphanumeric Multicall
      ** H742 Non standard Singletone 
         H683 Auto Call Repeat (2X)
         H641 Multicall Range
Incompatible options (cont'd):

         H368 Short Call Alphanumeric
         H369 Programmable numeric Short Call
         H632 Authorization w/ Single Tone Reset
         H622 Group Call Encode Lockout
         H633 Trakmode- Omit 5 Tone Encode Enc./Dec.
         H633 Trakmode- RAT X Tone per Mode
         H633 Trakmode- Manual & Automatic RAT disable
         H633 Trakmode- Call Code per Mode
         H633 Trakmode- Authorization disable
         H633 Trakmode- Non STD. Pretime
         H633 Trakmode- 5 Tone Encode only
         H633 Trakmode- RAT X Tone 5 Select
         H633 Trakmode- Multicall Level (100k)
         H633 Trakmode- Multicall Disable 100 Level  
                
       * Unless auto acknowledge ordered
      ** Not incompatible if Emergency Schemes 
         A, C, or D have been ordered.                

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
