^rH646 Auto Acknowledge with Status^r

The following digits are allowed  to be entered:  "0-9,G,R,J,K,L,M". It is
not required to define the "R"  tone when equal numbers are following.
The software accepts sequences like "11122".
A maximum of two varible positions have to be defined below the required
tone code positions.  Tone code position that have to  be fixed  can be
entered with the space key " " or the "_" key.
When no variable position is defined then H620 Auto Acknowledge becomes
enabled automatically after the incompatibility check is made.
To select the AUTOSTAT data field the [TAB] key has to be used.





This option requires one of the following options:

         STD. Decode Code
         H633 Trakmode- Decode Code per Mode

Incompatible options:

         H924 Encode only
         H809 Omit 5 Tone Enc./Dec.
         H273 Operator selectable Scan
         H344 Channel slaved Scan
                       
Applicable Model: MX3000

                 * * *  END  OF  HELP  TEXT  * * *
