^rH683 Auto Call Repeat^r

This option transmits the Call  Code twice.  The time interval between
the "Call" and the "Repeat" is equal to the encode pretime, programmed
for the selected channel. 
                         

This option requires one of the following options:

         STD. Call Code
         H633 Trakmode- Call Code per Mode





Incompatible options:




         H642 Decode only
         H809 Omit 5 Tone Enc./Dec.
         H966 Unit ID before & after Call
         STD. Multicall
         H626 Fixed alphanumeric Multicall
         H966 Unit ID before & after Call





       * H685 Manual & Automatic Repeater
      ** H959 Unit ID before Call
      ** H977 Unit ID after Call

       * when ordered with

         H959 Unit ID before Call  or
         H977 Unit ID after Call

      ** when ordered with 
         
         H685 Manual & Automatic Repeater

Applicable Models: MX1000, MX2000, MX3000
                 * * *  END  OF  HELP  TEXT  * * *
